INSERT INTO `config` ( `var` , `val` , `description` , `year` ) VALUES ( 'participant_project_summary_wordmax', '100', 'The maximum number of words acceptable in the project summary', '-1');
INSERT INTO `config` ( `var` , `val` , `description` , `year` ) VALUES ( 'participant_project_summary_wordmax', '100', 'The maximum number of words acceptable in the project summary', '2006');
ALTER TABLE `projects` ADD `summarycountok` TINYINT( 1 ) DEFAULT '1' NOT NULL AFTER `summary` ;
ALTER TABLE `judges_timeslots` ADD `allowdivisional` ENUM( 'no', 'yes' ) DEFAULT 'no' NOT NULL AFTER `endtime` ;
